Insert
Insert Off-Page Connectors

Select this option to insert a pair of off-page connectors for each line that crosses a page boundary.


Remove
Remove Off-Page Connectors

Select this option to remove the off-page connectors used for each line that crosses a page boundary .


Top Chart
Change Top Chart

Select this option to apply the changes to only the top chart.


All Charts
Change All Charts

Select this option to apply the changes to all charts and subcharts.


Rotate
Rotate to Match Line Direction

Select this option to rotate the off-page connectors to point in the direction of the line.


OK

Click OK or press Enter to validate the selections, close the dialog box, and return to the open chart.


Cancel

Click Cancel or press Esc to cancel the selections, close the dialog box, and return to the open chart.


Off-Page Connector Dialog Box
   Off-Page Connector

Use the Off-Page Connectors dialog box to configure the off-page connectors used in a flowchart.

Click the desired item to make a selection or press ALT+ the underlined letter to select it. Press TAB to move from one selection to the next.

To display help information for a specific item in the dialog box, click the item in the illustration below.